INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (9978, 'EPSG', 9978, '+proj=tmerc +lat_0=58 +lon_0=-3.8 +k=1 +x_0=139618.9493 +y_0=183110.794 +ellps=GRS80 +units=m +vunits=m +no_defs +type=crs', 'COMPD_CS["FNL22 Grid + ODN height",PROJCS["FNL22 Grid",GEOGCS["FNL22-IRF",DATUM["FNL22_Intermediate_Reference_Frame",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","1321"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","9974"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",58],PARAMETER["central_meridian",-3.8],PARAMETER["scale_factor",1],PARAMETER["false_easting",139618.9493],PARAMETER["false_northing",183110.794],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","9977"]],VERT_CS["ODN height",VERT_DATUM["Ordnance Datum Newlyn",2005,AUTHORITY["EPSG","5101"]],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Gravity-related height",UP],AUTHORITY["EPSG","5701"]],AUTHORITY["EPSG","9978"]]');