INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (9742, 'EPSG', 9742, '+proj=tmerc +lat_0=56.35 +lon_0=-2.75 +k=1 +x_0=74996.927 +y_0=133508.35 +ellps=GRS80 +units=m +vunits=m +no_defs +type=crs', 'COMPD_CS["EOS21 Grid + ODN height",PROJCS["EOS21 Grid",GEOGCS["EOS21-IRF",DATUM["EOS21_Intermediate_Reference_Frame",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","1308"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","9739"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",56.35],PARAMETER["central_meridian",-2.75],PARAMETER["scale_factor",1],PARAMETER["false_easting",74996.927],PARAMETER["false_northing",133508.35],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","9741"]],VERT_CS["ODN height",VERT_DATUM["Ordnance Datum Newlyn",2005,AUTHORITY["EPSG","5101"]],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Gravity-related height",UP],AUTHORITY["EPSG","5701"]],AUTHORITY["EPSG","9742"]]');