INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (9674, 'EPSG', 9674, '+proj=aea +lat_0=34 +lon_0=-120 +lat_1=43 +lat_2=48 +x_0=600000 +y_0=0 +ellps=GRS80 +nadgrids=us_noaa_TN.tif +units=m +no_defs +type=crs', 'PROJCS["NAD83 / USFS R6 Albers",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","us_noaa_TN.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Albers_Conic_Equal_Area"],PARAMETER["latitude_of_center",34],PARAMETER["longitude_of_center",-120],PARAMETER["standard_parallel_1",43],PARAMETER["standard_parallel_2",48],PARAMETER["false_easting",600000],PARAMETER["false_northing",0],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","9674"]]');