INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (8197, 'EPSG', 8197, '+proj=lcc +lat_1=43.200055605 +lat_0=43.200055605 +lon_0=-90.9388888888889 +k_0=1.0000349151 +x_0=113690.627381255 +y_0=53703.1202438405 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(HARN) / WISCRS Crawford (ftUS)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",43.200055605],PARAMETER["central_meridian",-90.9388888888889],PARAMETER["scale_factor",1.0000349151],PARAMETER["false_easting",373000],PARAMETER["false_northing",176190.987],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","8197"]]');