INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (8164, 'EPSG', 8164, '+proj=tmerc +lat_0=45.4333333333333 +lon_0=-90.2555555555556 +k=1.0000677153 +x_0=220980.441960884 +y_0=0.00853441706883413 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(HARN) / WISCRS Iron (ftUS)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",45.4333333333333],PARAMETER["central_meridian",-90.2555555555556],PARAMETER["scale_factor",1.0000677153],PARAMETER["false_easting",725000],PARAMETER["false_northing",0.028],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","8164"]]');