INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (8139, 'EPSG', 8139, '+proj=lcc +lat_1=45.7042237702778 +lat_0=45.7042237702778 +lon_0=-89.5444444444444 +k_0=1.0000686968 +x_0=70104.1401 +y_0=57588.0346 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NAD83(HARN) / WISCRS Oneida (m)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",45.7042237702778],PARAMETER["central_meridian",-89.5444444444444],PARAMETER["scale_factor",1.0000686968],PARAMETER["false_easting",70104.1401],PARAMETER["false_northing",57588.0346],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","8139"]]');