INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (8118, 'EPSG', 8118, '+proj=tmerc +lat_0=44.0361111111111 +lon_0=-92.6333333333333 +k=1.0000381803 +x_0=165506.73009906 +y_0=0.0103632207264414 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(HARN) / WISCRS St. Croix (ftUS)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",44.0361111111111],PARAMETER["central_meridian",-92.6333333333333],PARAMETER["scale_factor",1.0000381803],PARAMETER["false_easting",542999.997],PARAMETER["false_northing",0.034],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","8118"]]');