INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (8107, 'EPSG', 8107, '+proj=lcc +lat_1=42.6694620969444 +lat_0=42.6694620969444 +lon_0=-88.5416666666667 +k_0=1.0000367192 +x_0=232562.8651 +y_0=111088.2224 +ellps=GRS80 +towgs84=-0.9738,1.9453,0.5486,-1.3357e-07,-4.872e-08,-5.507e-08,0 +units=m +no_defs +type=crs', 'PROJCS["NAD83(HARN) / WISCRS Walworth (m)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[-0.9738,1.9453,0.5486,-1.3357E-07,-4.872E-08,-5.507E-08,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",42.6694620969444],PARAMETER["central_meridian",-88.5416666666667],PARAMETER["scale_factor",1.0000367192],PARAMETER["false_easting",232562.8651],PARAMETER["false_northing",111088.2224],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","8107"]]');