INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (8093, 'EPSG', 8093, '+proj=lcc +lat_1=44.8722811263889 +lat_0=44.8722811263889 +lon_0=-91.2888888888889 +k_0=1.000035079 +x_0=120091.44018288 +y_0=91687.9239014477 +ellps=GRS80 +towgs84=-0.9738,1.9453,0.5486,-1.3357e-07,-4.872e-08,-5.507e-08,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(HARN) / WISCRS Eau Claire (ftUS)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[-0.9738,1.9453,0.5486,-1.3357E-07,-4.872E-08,-5.507E-08,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",44.8722811263889],PARAMETER["central_meridian",-91.2888888888889],PARAMETER["scale_factor",1.000035079],PARAMETER["false_easting",394000],PARAMETER["false_northing",300812.797],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","8093"]]');