INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (7623, 'EPSG', 7623, '+proj=lcc +lat_1=45.7042237702778 +lat_0=45.7042237702778 +lon_0=-89.5444444444444 +k_0=1.0000686968 +x_0=70104.1402082804 +y_0=57588.0347472695 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(2011) / WISCRS Oneida (ftUS)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",45.7042237702778],PARAMETER["central_meridian",-89.5444444444444],PARAMETER["scale_factor",1.0000686968],PARAMETER["false_easting",230000],PARAMETER["false_northing",188936.744],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","7623"]]');