INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (7605, 'EPSG', 7605, '+proj=tmerc +lat_0=45.4388888888889 +lon_0=-88.1416666666667 +k=1.0000552095 +x_0=133502.668224536 +y_0=0.0064008128016256 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(2011) / WISCRS Florence (ftUS)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",45.4388888888889],PARAMETER["central_meridian",-88.1416666666667],PARAMETER["scale_factor",1.0000552095],PARAMETER["false_easting",438000.004],PARAMETER["false_northing",0.021],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","7605"]]');