INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (7578, 'EPSG', 7578, '+proj=lcc +lat_1=43.5750329397222 +lat_0=43.5750329397222 +lon_0=-90.7833333333333 +k_0=1.0000408158 +x_0=222504.4451 +y_0=47532.0602 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NAD83(2011) / WISCRS Vernon (m)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",43.5750329397222],PARAMETER["central_meridian",-90.7833333333333],PARAMETER["scale_factor",1.0000408158],PARAMETER["false_easting",222504.4451],PARAMETER["false_northing",47532.0602],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","7578"]]');