INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (7536, 'EPSG', 7536, '+proj=lcc +lat_1=44.9778568986111 +lat_0=44.9778568986111 +lon_0=-91.2944444444444 +k_0=1.0000391127 +x_0=60045.72 +y_0=44091.4346 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NAD83(2011) / WISCRS Chippewa (m)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",44.9778568986111],PARAMETER["central_meridian",-91.2944444444444],PARAMETER["scale_factor",1.0000391127],PARAMETER["false_easting",60045.72],PARAMETER["false_northing",44091.4346],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","7536"]]');