INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (7347, 'EPSG', 7347, '+proj=tmerc +lat_0=37.85 +lon_0=-87.3 +k=1.000015 +x_0=240000 +y_0=36000 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NAD83(2011) / InGCS Pike-Warrick (m)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",37.85],PARAMETER["central_meridian",-87.3],PARAMETER["scale_factor",1.000015],PARAMETER["false_easting",240000],PARAMETER["false_northing",36000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","7347"]]');