INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (6141, 'EPSG', 6141, '+proj=lcc +lat_0=19.3333333333333 +lon_0=80.5666666666667 +lat_1=19.3333333333333 +lat_2=19.7 +x_0=899160 +y_0=579120 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=ft +no_defs +type=crs', 'PROJCS["Cayman Islands National Grid 2011",GEOGCS["CIGD11",DATUM["Cayman_Islands_Geodetic_Datum_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6135"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",19.3333333333333],PARAMETER["central_meridian",80.5666666666667],PARAMETER["standard_parallel_1",19.3333333333333],PARAMETER["standard_parallel_2",19.7],PARAMETER["false_easting",2950000],PARAMETER["false_northing",1900000],UNIT["foot",0.3048],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","6141"]]');