INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (5482, 'EPSG', 5482, '+proj=stere +lat_0=-90 +lon_0=180 +k=0.994 +x_0=5000000 +y_0=1000000 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["RSRGD2000 / RSPS2000",GEOGCS["RSRGD2000",DATUM["Ross_Sea_Region_Geodetic_Datum_2000",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4764"]],PROJECTION["Polar_Stereographic"],PARAMETER["latitude_of_origin",-90],PARAMETER["central_meridian",180],PARAMETER["scale_factor",0.994],PARAMETER["false_easting",5000000],PARAMETER["false_northing",1000000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","5482"]]');