INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (29901, 'EPSG', 29901, '+proj=tmerc +lat_0=53.5 +lon_0=-8 +k=1 +x_0=200000 +y_0=250000 +ellps=airy +towgs84=482.5,-130.6,564.6,-1.042,-0.214,-0.631,8.15 +units=m +no_defs +type=crs', 'PROJCS["OSNI 1952 / Irish National Grid",GEOGCS["OSNI 1952",DATUM["OSNI_1952",SPHEROID["Airy 1830",6377563.396,299.3249646],TOWGS84[482.5,-130.6,564.6,-1.042,-0.214,-0.631,8.15]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4188"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",53.5],PARAMETER["central_meridian",-8],PARAMETER["scale_factor",1],PARAMETER["false_easting",200000],PARAMETER["false_northing",250000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","29901"]]');