INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (29900, 'EPSG', 29900, '+proj=tmerc +lat_0=53.5 +lon_0=-8 +k=1.000035 +x_0=200000 +y_0=250000 +a=6377340.189 +rf=299.3249646 +towgs84=506,-122,611,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["TM65 / Irish National Grid",GEOGCS["TM65",DATUM["TM65",SPHEROID["Airy Modified 1849",6377340.189,299.3249646],TOWGS84[506,-122,611,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4299"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",53.5],PARAMETER["central_meridian",-8],PARAMETER["scale_factor",1.000035],PARAMETER["false_easting",200000],PARAMETER["false_northing",250000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","29900"]]');