INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2954, 'EPSG', 2954, '+proj=sterea +lat_0=47.25 +lon_0=-63 +k=0.999912 +x_0=400000 +y_0=800000 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NAD83(CSRS) / Prince Edward Isl. Stereographic (NAD83)",GEOGCS["NAD83(CSRS)",DATUM["NAD83_Canadian_Spatial_Reference_System",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4617"]],PROJECTION["Oblique_Stereographic"],PARAMETER["latitude_of_origin",47.25],PARAMETER["central_meridian",-63],PARAMETER["scale_factor",0.999912],PARAMETER["false_easting",400000],PARAMETER["false_northing",800000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2954"]]');