INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (28600, 'EPSG', 28600, '+proj=tmerc +lat_0=24.45 +lon_0=51.2166666666667 +k=0.99999 +x_0=200000 +y_0=300000 +ellps=intl +towgs84=-128.16,-282.42,21.93,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["Qatar 1974 / Qatar National Grid",GEOGCS["Qatar 1974",DATUM["Qatar_1974",SPHEROID["International 1924",6378388,297],TOWGS84[-128.16,-282.42,21.93,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4285"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",24.45],PARAMETER["central_meridian",51.2166666666667],PARAMETER["scale_factor",0.99999],PARAMETER["false_easting",200000],PARAMETER["false_northing",300000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","28600"]]');