INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (27292, 'EPSG', 27292, '+proj=tmerc +lat_0=-44 +lon_0=171.5 +k=1 +x_0=457199.207308015 +y_0=457199.207308015 +ellps=intl +towgs84=84,-22,209,0,0,0,0 +to_meter=0.914398414616029 +no_defs +type=crs', 'PROJCS["NZGD49 / South Island Grid",GEOGCS["NZGD49",DATUM["New_Zealand_Geodetic_Datum_1949",SPHEROID["International 1924",6378388,297],TOWGS84[84,-22,209,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4272"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",-44],PARAMETER["central_meridian",171.5],PARAMETER["scale_factor",1],PARAMETER["false_easting",500000],PARAMETER["false_northing",500000],UNIT["British yard (Sears 1922)",0.914398414616029],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","27292"]]');