INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (27232, 'EPSG', 27232, '+proj=tmerc +lat_0=-46.6000096111111 +lon_0=168.342872 +k=1 +x_0=300002.66 +y_0=699999.58 +ellps=intl +towgs84=54.4,-20.1,183.1,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NZGD49 / Bluff Circuit",GEOGCS["NZGD49",DATUM["New_Zealand_Geodetic_Datum_1949",SPHEROID["International 1924",6378388,297],TOWGS84[54.4,-20.1,183.1,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4272"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",-46.6000096111111],PARAMETER["central_meridian",168.342872],PARAMETER["scale_factor",1],PARAMETER["false_easting",300002.66],PARAMETER["false_northing",699999.58],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","27232"]]');