INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (27221, 'EPSG', 27221, '+proj=tmerc +lat_0=-42.8863223611111 +lon_0=170.9799935 +k=1 +x_0=300000 +y_0=700000 +ellps=intl +towgs84=84,-22,209,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["NZGD49 / Hokitika Circuit",GEOGCS["NZGD49",DATUM["New_Zealand_Geodetic_Datum_1949",SPHEROID["International 1924",6378388,297],TOWGS84[84,-22,209,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4272"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",-42.8863223611111],PARAMETER["central_meridian",170.9799935],PARAMETER["scale_factor",1],PARAMETER["false_easting",300000],PARAMETER["false_northing",700000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","27221"]]');