INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (27205, 'EPSG', 27205, '+proj=tmerc +lat_0=-36.8798652777778 +lon_0=174.764339361111 +k=0.9999 +x_0=300000 +y_0=700000 +ellps=intl +nadgrids=nz_linz_nzgd2kgrid0005.tif +units=m +no_defs +type=crs', 'PROJCS["NZGD49 / Mount Eden Circuit",GEOGCS["NZGD49",DATUM["New_Zealand_Geodetic_Datum_1949",SPHEROID["International 1924",6378388,297],EXTENSION["PROJ4_GRIDS","nz_linz_nzgd2kgrid0005.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4272"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",-36.8798652777778],PARAMETER["central_meridian",174.764339361111],PARAMETER["scale_factor",0.9999],PARAMETER["false_easting",300000],PARAMETER["false_northing",700000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","27205"]]');