INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (26786, 'EPSG', 26786, '+proj=lcc +lat_0=41 +lon_0=-71.5 +lat_1=41.7166666666667 +lat_2=42.6833333333333 +x_0=182880.365760731 +y_0=0 +ellps=clrk66 +towgs84=1,140,165,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD27 / Massachusetts Mainland",GEOGCS["NAD27",DATUM["North_American_Datum_1927",SPHEROID["Clarke 1866",6378206.4,294.978698213898],TOWGS84[1,140,165,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4267"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",41],PARAMETER["central_meridian",-71.5],PARAMETER["standard_parallel_1",41.7166666666667],PARAMETER["standard_parallel_2",42.6833333333333],PARAMETER["false_easting",600000],PARAMETER["false_northing",0],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","26786"]]');