INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (23330, 'EPSG', 23330, '+proj=lcc +lat_1=38.45 +lat_0=38.45 +lon_0=-89.15 +k_0=1.000015 +x_0=99974.5999491998 +y_0=1150012.7000254 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(2011) / ICS83-Mount Vernon (ftUS)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",38.45],PARAMETER["central_meridian",-89.15],PARAMETER["scale_factor",1.000015],PARAMETER["false_easting",328000],PARAMETER["false_northing",3773000],UNIT["US survey foot",0.304800609601219],AUTHORITY["EPSG","23330"]]');