INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (23325, 'EPSG', 23325, '+proj=lcc +lat_1=39.3 +lat_0=39.3 +lon_0=-90.15 +k_0=1.00002 +x_0=1749860.2997206 +y_0=840030.48006096 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(2011) / ICS83-Carlinville (ftUS)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",39.3],PARAMETER["central_meridian",-90.15],PARAMETER["scale_factor",1.00002],PARAMETER["false_easting",5741000],PARAMETER["false_northing",2756000],UNIT["US survey foot",0.304800609601219],AUTHORITY["EPSG","23325"]]');