INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (23322, 'EPSG', 23322, '+proj=lcc +lat_1=39.75 +lat_0=39.75 +lon_0=-89.65 +k_0=1.000022 +x_0=709880.619761239 +y_0=879959.359918719 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(2011) / ICS83-Springfield (ftUS)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",39.75],PARAMETER["central_meridian",-89.65],PARAMETER["scale_factor",1.000022],PARAMETER["false_easting",2329000],PARAMETER["false_northing",2887000],UNIT["US survey foot",0.304800609601219],AUTHORITY["EPSG","23322"]]');