INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (23311, 'EPSG', 23311, '+proj=tmerc +lat_0=37.4 +lon_0=-89.65 +k=1.000023 +x_0=420015.24003048 +y_0=189585.979171958 +ellps=GRS80 +towgs84=0,0,0,0,0,0,0 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83(2011) / ICS83-Peoria (ftUS)",GEOGCS["NAD83(2011)",DATUM["NAD83_National_Spatial_Reference_System_2011",SPHEROID["GRS 1980",6378137,298.257222101],TOWGS84[0,0,0,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","6318"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",37.4],PARAMETER["central_meridian",-89.65],PARAMETER["scale_factor",1.000023],PARAMETER["false_easting",1378000],PARAMETER["false_northing",622000],UNIT["US survey foot",0.304800609601219],AUTHORITY["EPSG","23311"]]');