INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2326, 'EPSG', 2326, '+proj=tmerc +lat_0=22.3121333333333 +lon_0=114.178555555556 +k=1 +x_0=836694.05 +y_0=819069.8 +ellps=intl +towgs84=-162.619,-276.961,-161.763,0.067741,-2.243649,-1.158827,-1.094239 +units=m +no_defs +type=crs', 'PROJCS["Hong Kong 1980 Grid System",GEOGCS["Hong Kong 1980",DATUM["Hong_Kong_1980",SPHEROID["International 1924",6378388,297],TOWGS84[-162.619,-276.961,-161.763,0.067741,-2.243649,-1.158827,-1.094239]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4611"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",22.3121333333333],PARAMETER["central_meridian",114.178555555556],PARAMETER["scale_factor",1],PARAMETER["false_easting",836694.05],PARAMETER["false_northing",819069.8],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","2326"]]');