INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2275, 'EPSG', 2275, '+proj=lcc +lat_0=34 +lon_0=-101.5 +lat_1=36.1833333333333 +lat_2=34.65 +x_0=200000.0001016 +y_0=999999.999898399 +ellps=GRS80 +nadgrids=us_noaa_uthpgn.tif +units=us-ft +no_defs +type=crs', 'PROJCS["NAD83 / Texas North (ftUS)",GEOGCS["NAD83",DATUM["North_American_Datum_1983",SPHEROID["GRS 1980",6378137,298.257222101],EXTENSION["PROJ4_GRIDS","us_noaa_uthpgn.tif"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4269"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",34],PARAMETER["central_meridian",-101.5],PARAMETER["standard_parallel_1",36.1833333333333],PARAMETER["standard_parallel_2",34.65],PARAMETER["false_easting",656166.667],PARAMETER["false_northing",3280833.333],UNIT["US survey foot",0.304800609601219],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2275"]]');