INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2200, 'EPSG', 2200, '+proj=sterea +lat_0=46.5 +lon_0=-66.5 +k=0.999912 +x_0=300000 +y_0=800000 +a=6378135 +rf=298.257 +units=m +no_defs +type=crs', 'PROJCS["ATS77 / New Brunswick Stereographic (ATS77)",GEOGCS["ATS77",DATUM["Average_Terrestrial_System_1977",SPHEROID["Average Terrestrial System 1977",6378135,298.257,AUTHORITY["EPSG","7041"]],AUTHORITY["EPSG","6122"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4122"]],PROJECTION["Oblique_Stereographic"],PARAMETER["latitude_of_origin",46.5],PARAMETER["central_meridian",-66.5],PARAMETER["scale_factor",0.999912],PARAMETER["false_easting",300000],PARAMETER["false_northing",800000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","2200"]]');