INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2192, 'EPSG', 2192, '+proj=lcc +lat_1=46.8 +lat_0=46.8 +lon_0=2.33722916666667 +k_0=0.99987742 +x_0=600000 +y_0=2200000 +ellps=intl +towgs84=-84,-107,-120,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["ED50 / France EuroLambert",GEOGCS["ED50",DATUM["European_Datum_1950",SPHEROID["International 1924",6378388,297],TOWGS84[-84,-107,-120,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4230"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",46.8],PARAMETER["central_meridian",2.33722916666667],PARAMETER["scale_factor",0.99987742],PARAMETER["false_easting",600000],PARAMETER["false_northing",2200000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2192"]]');