INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2163, 'EPSG', 2163, '+proj=laea +lat_0=45 +lon_0=-100 +x_0=0 +y_0=0 +ellps=sphere +units=m +no_defs +type=crs', 'PROJCS["US National Atlas Equal Area (deprecated)",GEOGCS["Unspecified datum based upon the Clarke 1866 Authalic Sphere (deprecated)",DATUM["Not_specified_based_on_Clarke_1866_Authalic_Sphere",SPHEROID["Clarke 1866 Authalic Sphere",6370997,0,AUTHORITY["EPSG","7052"]],AUTHORITY["EPSG","6052"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4052"]],PROJECTION["Lambert_Azimuthal_Equal_Area"],PARAMETER["latitude_of_center",45],PARAMETER["longitude_of_center",-100],PARAMETER["false_easting",0],PARAMETER["false_northing",0],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2163"]]');