INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2136, 'EPSG', 2136, '+proj=tmerc +lat_0=4.66666666666667 +lon_0=-1 +k=0.99975 +x_0=274319.739163358 +y_0=0 +a=6378300 +rf=296 +towgs84=-171.16,17.29,325.21,0,0,0.814,-0.38 +to_meter=0.304799710181509 +no_defs +type=crs', 'PROJCS["Accra / Ghana National Grid",GEOGCS["Accra",DATUM["Accra",SPHEROID["War Office",6378300,296],TOWGS84[-171.16,17.29,325.21,0,0,0.814,-0.38]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4168"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",4.66666666666667],PARAMETER["central_meridian",-1],PARAMETER["scale_factor",0.99975],PARAMETER["false_easting",900000],PARAMETER["false_northing",0],UNIT["Gold Coast foot",0.304799710181509],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2136"]]');