INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2036, 'EPSG', 2036, '+proj=sterea +lat_0=46.5 +lon_0=-66.5 +k=0.999912 +x_0=2500000 +y_0=7500000 +ellps=GRS80 +units=m +no_defs +type=crs', 'PROJCS["NAD83(CSRS98) / New Brunswick Stereo (deprecated)",GEOGCS["NAD83(CSRS98) (deprecated)",DATUM["NAD83_Canadian_Spatial_Reference_System",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","6140"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree minute second hemisphere",0.0174532925199433,AUTHORITY["EPSG","9108"]],AUTHORITY["EPSG","4140"]],PROJECTION["Oblique_Stereographic"],PARAMETER["latitude_of_origin",46.5],PARAMETER["central_meridian",-66.5],PARAMETER["scale_factor",0.999912],PARAMETER["false_easting",2500000],PARAMETER["false_northing",7500000],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AUTHORITY["EPSG","2036"]]');