INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (2007, 'EPSG', 2007, '+proj=tmerc +lat_0=0 +lon_0=-62 +k=0.9995 +x_0=400000 +y_0=0 +a=6378249.145 +rf=293.465 +towgs84=195.671,332.517,274.607,0,0,0,0 +units=m +no_defs +type=crs', 'PROJCS["St. Vincent 45 / British West Indies Grid",GEOGCS["St. Vincent 1945",DATUM["St_Vincent_1945",SPHEROID["Clarke 1880 (RGS)",6378249.145,293.465],TOWGS84[195.671,332.517,274.607,0,0,0,0]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4607"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",0],PARAMETER["central_meridian",-62],PARAMETER["scale_factor",0.9995],PARAMETER["false_easting",400000],PARAMETER["false_northing",0],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","2007"]]');