INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (103671, 'ESRI', 103671, '+proj=lcc +lat_0=44.4561111111111 +lon_0=-94.6333333333333 +lat_1=44.5333333333333 +lat_2=44.9166666666667 +x_0=152400.30480061 +y_0=30480.0609601219 +a=6378414.369 +rf=298.257222100883 +units=m +no_defs +type=crs', 'PROJCS["NAD_1983_HARN_Adj_MN_Renville_Meters",GEOGCS["GCS_NAD_1983_HARN_Adj_MN_Renville",DATUM["D_NAD_1983_HARN_Adj_MN_Renville",SPHEROID["S_GRS_1980_Adj_MN_Renville",6378414.369,298.257222100883,AUTHORITY["ESRI","107763"]],AUTHORITY["ESRI","106763"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["ESRI","104763"]],PROJECTION["Lambert_Conformal_Conic_2SP"],PARAMETER["latitude_of_origin",44.4561111111111],PARAMETER["central_meridian",-94.6333333333333],PARAMETER["standard_parallel_1",44.5333333333333],PARAMETER["standard_parallel_2",44.9166666666667],PARAMETER["false_easting",152400.30480061],PARAMETER["false_northing",30480.0609601219],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["ESRI","103671"]]');