INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (103462, 'ESRI', 103462, '+proj=lcc +lat_1=43.5750329397222 +lat_0=43.5750329397222 +lon_0=-90.7833333333333 +k_0=1.0000408158 +x_0=222504.44500889 +y_0=47532.0603505207 +ellps=GRS80 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD_1983_HARN_WISCRS_Vernon_County_Feet (deprecated)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","6152"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",43.5750329397222],PARAMETER["central_meridian",-90.7833333333333],PARAMETER["scale_factor",1.0000408158],PARAMETER["false_easting",730000],PARAMETER["false_northing",155944.768],UNIT["US survey foot",0.304800609601219,AUTHORITY["EPSG","9003"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["ESRI","103462"]]');