INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (103452, 'ESRI', 103452, '+proj=lcc +lat_1=43.3223129275 +lat_0=43.3223129275 +lon_0=-90.4305555555556 +k_0=1.0000375653 +x_0=202387.60477521 +y_0=134255.425450851 +ellps=GRS80 +units=us-ft +no_defs +type=crs', 'PROJCS["NAD_1983_HARN_WISCRS_Richland_County_Feet (deprecated)",GEOGCS["NAD83(HARN)",DATUM["NAD83_High_Accuracy_Reference_Network",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","6152"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","4152"]],PROJECTION["Lambert_Conformal_Conic_1SP"],PARAMETER["latitude_of_origin",43.3223129275],PARAMETER["central_meridian",-90.4305555555556],PARAMETER["scale_factor",1.0000375653],PARAMETER["false_easting",664000],PARAMETER["false_northing",440469.675],UNIT["US survey foot",0.304800609601219,AUTHORITY["EPSG","9003"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["ESRI","103452"]]');