INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (10228, 'EPSG', 10228, '+proj=tmerc +lat_0=52.2 +lon_0=-1.15 +k=1 +x_0=175262.1809 +y_0=174688.2508 +ellps=GRS80 +units=m +vunits=m +no_defs +type=crs', 'COMPD_CS["MALS09 Grid + ODN height",PROJCS["MALS09 Grid",GEOGCS["MALS09-IRF",DATUM["MALS09_Intermediate_Reference_Frame",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","1343"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","10224"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",52.2],PARAMETER["central_meridian",-1.15],PARAMETER["scale_factor",1],PARAMETER["false_easting",175262.1809],PARAMETER["false_northing",174688.2508],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","10227"]],VERT_CS["ODN height",VERT_DATUM["Ordnance Datum Newlyn",2005,AUTHORITY["EPSG","5101"]],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Gravity-related height",UP],AUTHORITY["EPSG","5701"]],AUTHORITY["EPSG","10228"]]');