INSERT into spatial_ref_sys (srid, auth_name, auth_srid, proj4text, srtext) values (10208, 'EPSG', 10208, '+proj=tmerc +lat_0=51.85 +lon_0=-1.3 +k=1 +x_0=511622.854 +y_0=324737.4633 +ellps=GRS80 +units=m +vunits=m +no_defs +type=crs', 'COMPD_CS["DIBA15 Grid + ODN height",PROJCS["DIBA15 Grid",GEOGCS["DIBA15-IRF",DATUM["DIBA15_Intermediate_Reference_Frame",SPHEROID["GRS 1980",6378137,298.257222101,AUTHORITY["EPSG","7019"]],AUTHORITY["EPSG","1339"]],PRIMEM["Greenwich",0,AUTHORITY["EPSG","8901"]],UNIT["degree",0.0174532925199433,AUTHORITY["EPSG","9122"]],AUTHORITY["EPSG","10204"]],PROJECTION["Transverse_Mercator"],PARAMETER["latitude_of_origin",51.85],PARAMETER["central_meridian",-1.3],PARAMETER["scale_factor",1],PARAMETER["false_easting",511622.854],PARAMETER["false_northing",324737.4633],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Easting",EAST],AXIS["Northing",NORTH],AUTHORITY["EPSG","10207"]],VERT_CS["ODN height",VERT_DATUM["Ordnance Datum Newlyn",2005,AUTHORITY["EPSG","5101"]],UNIT["metre",1,AUTHORITY["EPSG","9001"]],AXIS["Gravity-related height",UP],AUTHORITY["EPSG","5701"]],AUTHORITY["EPSG","10208"]]');